From 7570ad0ca6960c34a32321bb76a524d8a5ca0f39 Mon Sep 17 00:00:00 2001
From: Christophe Roger <darwiinc@live.fr>
Date: Sun, 9 Oct 2016 19:16:17 +1100
Subject: Architect profile as default

---
 cv.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'cv.tex')

diff --git a/cv.tex b/cv.tex
index bab00b3..aee14ad 100755
--- a/cv.tex
+++ b/cv.tex
@@ -2,7 +2,7 @@
 \documentclass[localFont]{awesome-source-cv}
 
 \name{Christophe}{ROGER}
-\tagline{Chef de projet IT}
+\tagline{Architecte Logiciel | Développeur/Concepteur Java/JEE}
 \socialinfo{
 	\linkedin{christopheroger}
 	\viadeo{christopheroger}
@@ -17,7 +17,7 @@
 
 	\makecvheader
 
-	\input{section_headline}
+	\input{section_headline_archi}
 	\input{section_competences}				% Section compétence
 	\input{section_experience_short}		% Section expérience
 	\input{section_langues}					% Section langues
-- 
cgit v1.2.1

